\documentclass{resume} % Use the custom resume.cls style
\usepackage{enumitem}
\setlist{nosep}

\usepackage[left=0.4 in,top=0.3in,right=0.4 in,bottom=0.4in]{geometry} % Document margins
%\newcommand{\tab}[1]{\hspace{.2667\textwidth}\rlap{#1}}
%\newcommand{\itab}[1]{\hspace{0em}\rlap{#1}}
\name{Aidan Sharpe} % Your name
% You can merge both of these into a single line, if you do not have a website.
\address{(609) 738-5237 \\ Hightstown, NJ \\ amsharpe102@pm.me \\ www.sharpe6.com}
% \address{\href{mailto:amsharpe102@pm.me}{amsharpe102@pm.me} \\ \href{https://www.linkedin.com/in/aidan-sharpe-b86955224/}{Linked In} \\ \href{https://www.sharpe6.com}{Website}}


\begin{document}

	%----------------------------------------------------------------------------------------
	%	OBJECTIVE
	%----------------------------------------------------------------------------------------
	\begin{rSection}{Overview}
        Initiative-taking engineer with years of diverse electronics and programming experience including designing and maintaining professional high-speed PCBs, developing internal software tooling, leading the avionics subteam of Rowan Rocketry, and running technical workshops for the Rowan University IEEE Student Branch.
	\end{rSection}

	%----------------------------------------------------------------------------------------
    % WORK EXPERIENCE
	%----------------------------------------------------------------------------------------
	\begin{rSection}{WORK EXPERIENCE}
        \textbf{Industrial Hardware Development Intern} \hfill Summer 2024 \\
    Inductotherm Corp. \hfill \emph{Rancocas, NJ}
        \begin{itemize}[topsep=-8pt]
            \item Proposed and created an internal Windows Forms tool to resolve disorganized PCB design libraries
            \item Modernized a proprietary 5V industrial embedded system with a 3.3V microcontroller, ethernet interface, and USB C programming interface while maintaining full backward compatibility
            \item Enabled high-speed design reuse by creating Altium Designer schematic and PCB snippets for USB C and Ethernet interfaces
            \item Created manufacturing releases for high-speed, controlled impedance designs using Altium Designer
        \end{itemize}
        \medskip
        \textbf{Industrial Internet of Things (IIoT) Intern} \hfill Summer 2023 \\
    Inductotherm Corp. \hfill \emph{Rancocas, NJ}
        \begin{itemize}[topsep=-8pt]
            \item Proposed and installed a new IIoT gateway operating system to enable remote system deployments, updates, and diagnostics
            \item Removed human error by extending an internal configuration tool to directly generate and export IIoT gateway configuration files
            \item Wrote custom software to enable automatic gateway reconfiguration and telemetry with Azure IoT Hub
        \end{itemize}
	\end{rSection}

    %----------------------------------------------------------------------------------------
	% TECHINICAL STRENGTHS	
	%----------------------------------------------------------------------------------------
	\begin{rSection}{SKILLS}
		\begin{tabular}{ @{} >{\bfseries}l @{\hspace{6ex}} l }
            Electronics Design & High-speed, impedance-controlled routing; 2, 4 \& 6-layer boards; hierarchical schematics
            \\
			Programming & C\#, Python, C, C++, Verilog HDL, Java, Bash, MatLab
			\\
            Server \& IoT & Debian and Fedora Linux, Azure IoT Hub, Docker, Podman, Secure Shell (ssh)
			\\ 
            CAD Packages & Altium Designer, KiCAD, FreeCAD, OnShape
			\\
            Development Tools & Vim, Git/GitHub, Azure DevOps, Visual Studio, VSCode, Eclipse
            \\
			Soft Skills & Technical documentation and writing, professional written and verbal communication
		\end{tabular}
	\end{rSection}

    \begin{rSection}{PROJECTS}
        \textbf{Rowan Spaceport America Cup Team} \hfill September 2023 -- Present
        \begin{itemize}[topsep=-8pt]
            \item Led the avionics subteam to design and test a valve controller for a pneumatic parachute deployment system
			\item Implemented an avionics system using commercial-off-the-shelf components
            \item Successfully launched and recovered the rocket at Spaceport America Cup 2024
			\item Actively developing a modular STM32-based flight computer with KiCAD
            \item Developed a switching power supply board to power flight computers from a 9V battery
        \end{itemize}
    \end{rSection}

	%----------------------------------------------------------------------------------------
	%	EDUCATION SECTION
	%----------------------------------------------------------------------------------------
	\begin{rSection}{Education}
	\textbf{Rowan University} \hfill \emph{Glassboro, NJ} \\
	B.S. in Electrical and Computer Engineering \hfill Expected May 2025 \\
	Certificate of Undergraduate Study in Cybersecurity Engineering \\
    GPA: 3.76\\
    Martinson Honors College \hfill Fall 2021 -- Present
	\end{rSection}

	%----------------------------------------------------------------------------------------
	%   AWARDS AND SCHOLARSHIPS
	%----------------------------------------------------------------------------------------
    \begin{rSection}{Awards \& Scholarships}
        Eagle Scout \hfill March 2020 \\
        Delta Ducon Engineering Scholarship \hfill May 2024 \\
        Professional Engineering Society of Mercer County --- Engineering Student Scholarship \hfill 2021
    \end{rSection}
\end{document}
